η 2- 1.5- 1- 0.5- 0 0.5 1 1.5 2

Uncertainty

0.1 - 0.05 - 0 0.05

0.1 = 0.9 TeV s INEL @

η 2- 1.5- 1- 0.5- 0 0.5 1 1.5 2

Uncertainty

0.1 - 0.05 - 0 0.05

0.1 = 2.76 TeV s INEL @

η 2- 1.5- 1- 0.5- 0 0.5 1 1.5 2

Uncertainty

0.1 - 0.05 - 0 0.05

0.1 = 7 TeV s INEL @

η 2- 1.5- 1- 0.5- 0 0.5 1 1.5 2

Uncertainty

0.1 - 0.05 - 0 0.05

0.1 = 8 TeV s INEL @ η 2- 1.5- 1- 0.5- 0 0.5 1 1.5 2

Uncertainty

0.1 - 0.05 - 0 0.05

0.1 = 0.9 TeV s NSD @

Total systematic uncertainty

Run-to-run fluctuations

η 2- 1.5- 1- 0.5- 0 0.5 1 1.5 2

Uncertainty

0.1 - 0.05 - 0 0.05

0.1 = 2.76 TeV s NSD @

ALICE pp

η 2- 1.5- 1- 0.5- 0 0.5 1 1.5 2

Uncertainty

0.1 - 0.05 - 0 0.05

0.1 = 7 TeV s NSD @

η 2- 1.5- 1- 0.5- 0 0.5 1 1.5 2

Uncertainty

0.1 - 0.05 - 0 0.05

0.1 = 8 TeV s NSD @ η 1- 0.5- 0 0.5 1

Uncertainty

0.06 - 0.04 - 0.02 - 0 0.02

0.04

0.06 = 0.9 TeV s INEL>0 @

η 1- 0.5- 0 0.5 1

Uncertainty

0.06 - 0.04 - 0.02 - 0 0.02

0.04

0.06 = 2.76 TeV s INEL>0 @

η 1- 0.5- 0 0.5 1

Uncertainty

0.06 - 0.04 - 0.02 - 0 0.02

0.04

0.06 = 7 TeV s INEL>0 @

η 1- 0.5- 0 0.5 1

Uncertainty

0.06 - 0.04 - 0.02 - 0 0.02

0.04

0.06 = 8 TeV s INEL>0 @